/*
 Navicat MySQL Data Transfer

 Source Server         : -
 Source Server Type    : MySQL
 Source Server Version : 100422
 Source Host           : localhost:3306
 Source Schema         : alexiss

 Target Server Type    : MySQL
 Target Server Version : 100422
 File Encoding         : 65001

 Date: 01/04/2022 20:23:26
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for custom_commands
-- ----------------------------
DROP TABLE IF EXISTS `custom_commands`;
CREATE TABLE `custom_commands`  (
  `id` int NOT NULL,
  `name` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `permission` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `keys` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `user1` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `user2` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `effect1` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL,
  `effect2` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL,
  `duration1` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `duration2` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `min_distance` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `max_distance` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
